Santa Hat Artificial Grass Doormat

Sanctuary are happy to announce the availability of our CHRISTMAS artificial grass doormats !!! Approx 2.5ft x 1ft Due to the popularity of our existing artificial doormats, Mark got his Santa hat on and produced a unique Christmas version. Artificial grass is a perfect solution for doormats. Easy to clean and maintain, durable and quickly dry after rain it is very practical and a much better solution than standard doormats. (Note: €8.00 Post & Packaging) Choose pack quantity from the drop down below (pack of 1,2,3,4). Your chosen pack quantity will appear as 1 when adding to cart.